\begin{table}%t2
\caption{Apparent (first 6 lines) and absolute (last 6 lines) magnitude calculated in the $H$, $K$s and~$I_{\rm c}$~band. The values marked with an asterisk refer to the Freed et~al. (\cite{Freed2003}) paper.}
\label{table_phot2}
%\centering
\par
\begin{tabular}{lcc}
\hline
\hline
 & LHS 2397aA & LHS 2397aB \\
\hline
$m_{I_{\rm c}}$ & 14.81 $\pm$ 0.01 & 19.08 $\pm$ 0.14 \\
$m_{I_{\rm c}}^{*}$ & 15.07 $\pm$ 0.03 & 19.49  $\pm$ 0.17 \\
$m_{H}$ & 11.32 $\pm$ 0.02 & 14.35 $\pm$ 0.25 \\
$m_{H}^{*}$ & 11.32 $\pm$ 0.05 & 14.47  $\pm$ 0.30 \\
$m_{K{\rm s}}$ &10.82 $\pm$ 0.02 &  13.36 $\pm$ 0.02   \\
$m_{K{\rm s}}^{*}$ & 10.80 $\pm$ 0.03  &  13.57 $\pm$ 0.10  \\
\hline
$M_{I_{\rm c}}$ & 14.03 $\pm$ 0.06 & 18.30  $\pm$ 0.15 \\
$M_{I_{\rm c}}^{*}$ & 14.29   $\pm$ 0.07 & 18.71 $\pm$ 0.18 \\
$M_{H}$ & 10.56$\pm$ 0.14 &  13.58  $\pm$ 0.18 \\
$M_{H}^{*}$ & 10.54  $\pm$ 0.08 &13.69 $\pm$0.31 \\
$M_{K{\rm s}}$ & 10.05 $\pm$ 0.14 &  12.58 $\pm$ 0.14\\
$M_{K{\rm s}}^{*}$ & 10.03 $\pm$ 0.07 & 12.80  $\pm$ 0.12 \\
\hline
\end{tabular}
\end{table}