\begin{table}%t3
%%\centering
\par
\caption{ISGRI veto efficiency.}\label{table:ISGRIeff}
\begin{tabular}{lccccc} \hline\hline
Config & Before\footnote{Obtained from unsaturated sections of telemetry. This
throughput is not sustainable with actual TLM and the determination
has large errors.} & After & Change & Dead & Veto \\
       &        &       &        & Time\footnote{Dead time assumes 6~$\mu$s ISGRI-VETO strobe length which
was in use during these tests.} & Effect \\ \hline
No veto & 2500 & 2500 & 0\% & 0\% & 0\% \\
Zone Lat & 2500 & 1146 & 54\% & 8.7\% & 45\% \\
Zone All\footnote{This will give an over-estimate of the veto effect
since there will be more Compton events generated due to the
high rates in PICSIT.} & 2500 & 750 & 70\% & 14\% & 55\% \\
Zone All\footnote{Includes the effect of Compton events in the previous
case to give a better comparison to the no veto case.} & 2500 & 880 & 65\% & 14\% & 51\% \\ \hline
\end{tabular}
\end{table}