\begin{table}%T5
\caption{Mean values and standard deviations of M2/M1, electron beam power
above 20 keV and coronal pressure for both non-WLFs and WLFs in the overlap regions of GOES class C7.8 - M7.4.}\label{tab5}
%\centering
\par
\begin{tabular}{|l|l|l|l|l|l|} \hline\hline
Mean M2/M1  & Mean M2/M1 & Mean $P_{\rm e}$ & Mean $P_{\rm e}$ & Mean pressure & Mean pressure  \\ 
WLF & Non-WLF & erg s$^{-1}$ (WLF) &  erg s$^{-1}$ (non-WLF) & dynes cm$^{-2}$ (WLF) & dynes cm$^{-2}$ (non-WLF)\\ \hline
0.56 $\pm$ 0.23 & 0.44 $\pm$ 0.20 & $3.37  \pm 4.9 \times 10^{29}$ & $1.74  \pm 1.56 \times 10^{28}$ & 615 $\pm$ 272 & 326 $\pm$ 144 \\ \hline
\end{tabular}
\end{table}