\begin{table}%T5
%\centering
\par
\caption{The amplitude of $\omega(\theta)$ at 1 degree, $A_{\omega}$,
  the slope $\delta$ and the comoving correlation length $r_0$
  (in~$h^{-1}$~Mpc), for each field and for different magnitude
  limited samples considered in this paper. $r_0$ measurements are
  computed for three standard cosmological models.  To derive $r_0$ we
  assume a top-hat redshift distribution centred at $\overline z =
  3.2$ and the best fitted value of the slope. Result marked as CFDF
  mean are computed from the mean over all three fields.  The error
  bars shown correspond to Poisson error bars. An extra systematic
  errorbar arising from our uncertainty in the underlying redshift
  range of our Lyman-break sources of $\pm 0.2$ for the entire faint
  samples and of $\pm 0.4$ for the bright sample should be added. (Our
  principal results are highlighted in bold.)}
\label{tab:resultr0}
\begin{tabular}{*{7}{c}}\hline\hline
{\bf Field} & magnitude limit &  $A_{\omega}$(1 deg) & $\delta$ & $r_0$ 
            ($h^{-1}$ Mpc) & $r_0$ ($h^{-1}$ Mpc) & $r_0$ ($h^{-1}$ Mpc) \\
 & ($I_{AB}$) & $\times10^{-3}$ & & $\Omega_{0}=1.0$, & $\Omega_{0}=0.2$, & $\Omega_{0}=0.3$, \\
 &           &                 & & $\Omega_{\Lambda}=0.0$ & $\Omega_{\Lambda}=0.0$ &
                                                                $\Omega_{\Lambda}=0.7$ \\
\hline               
{\bf CFDF-14} & 20.0--24.5 &  $\rm 5.9^{+13.2}_{-4.0}$ & 
            $\rm {\bf0.81}^{+0.21}_{-0.24}$ & $\rm 3.2^{+4.0}_{-1.2}$ &  $\rm 3.6^{+4.4}_{-1.3}$ & $\rm 5.3^{+6.6}_{-2.0}$ \\
          & 20.0--23.5 & $\rm 7.8^{+166.0}_{-7.7}$ & 
            $\rm 1.08^{+0.84}_{-0.66}$ & $\rm 5.8^{+59.8}_{-2.8}$ &  $\rm 6.8^{+69.3}_{-3.2}$ & $\rm 9.5^{+97.7}_{-4.5}$ \\
          & 23.5--24.5 & $\rm 2.3^{+6.4}_{-1.7}$ &
            $\rm 0.96^{+0.25}_{-0.26}$ & $\rm 2.6^{+3.2}_{-1.0}$ &  $\rm 3.0^{+4.2}_{-1.1}$ &  $4.3^{+6.1}_{-1.6}$ \\
{\bf CFDF-22} & 20.0--24.5 &  $\rm 8.1^{+40.9}_{-6.0}$ & 
            $\rm {\bf0.81}^{+0.25}_{-0.35}$ & $\rm 3.8^{+10.7}_{-1.6}$ &
            $\rm 4.2^{+11.8}_{-1.7}$ & $\rm 6.3^{+17.7}_{-2.6}$ \\
{\bf CFDF-03} & 20.0--24.5 &  8.6$~\pm~$0.6 & 0.8 & 3.9$~\pm~$0.2 & 4.3$~\pm~$0.2 &  6.4$~\pm~$0.3 \\
% &  &  &  &  &  & \\  
{\bf CFDF mean} & 20.0--24.5 &  7.4$~\pm~$1.0 & 0.8 & 3.6$~\pm~$0.3 &
            3.9$~\pm~$0.3 &  {\bf 5.9$~\pm~$0.5} \\
{\bf CFDF-14} & 20.0--23.5 & 24.9$~\pm~$7.9 & 0.8 & 7.0$~\pm~$1.2 &
            7.7$~\pm~$1.4 & {\bf 11.6$~\pm~$2.0} \\
          & 23.5--24.5 & 5.4$~\pm~$1.1 & 0.8 & 3.0$~\pm~$0.3 & 3.3$~\pm~$0.4
            & {\bf 5.0$~\pm~$0.6} \\
\hline 
\end{tabular}
\end{table}