\begin{table}%T1
%\centering
\par
\caption{Details of the CFDF images used in this study. For the 03~hr and 14~hr
fields, we list the $3\sigma$ detection  limit inside an aperture of
$3''$ for images convolved to the worst seeing (i.e. 1.3$''$ for 03~hr
and 1.4$''$ for 14~hr). For the 22~hr field, we list the $3\sigma$ detection limit  
inside an aperture of $4''$ for un-convolved images.}
\label{tab:cfdf.fields}
\begin{tabular}{*{5}{c}}
\hline\hline
{\bfseries Field}   & RA     & Dec      & Band & $3\sigma$ limit\\
                    & (J2000)   & (J2000)    &      & ($AB$ mags) \\
\par
\hline                                                                       
{\bfseries 0300+00} & 03:02:40 & +00:10:21 & $U$ & 26.98 \\
                    &          &           & $B$ & 26.38 \\
                    &          &           & $V$ & 26.40 \\
                    &          &           & $I$ & 25.62 \\
                    &          &           &   &       \\
{\bfseries 1415+52} & 14:17:54 & +52:30:31 & $U$ & 27.71 \\
                    &          &           & $B$ & 26.23 \\
                    &          &           & $V$ & 25.98 \\
                    &          &           & $I$ & 25.16 \\
                    &          &           &   &       \\
{\bfseries 2215+00} & 22:17:48 & +00:17:13 & $U$ & 27.16 \\
                    &          &           & $B$ & 25.76 \\
                    &          &           & $V$ & 26.18 \\
                    &          &           & $I$ & 25.22 \\
\hline
\end{tabular}
\end{table}