\begin{table}%t1
   %\centering
\par
      \caption{The properties of EUV blinkers due to Bewsher et~al. (\cite{Bewsher02}).\label{tab1}}
 \begin{tabular}{ll}
            \hline\hline
            \noalign{\smallskip}
	Property & Value \\
            \noalign{\smallskip}
            \hline
            \noalign{\smallskip}
	Global frequency & 10--20 s$^{-1}$  \\
	Mean intensity enhancement (O V) & 70--80\% \\
	Mean Area & 2--$3 \times 10^{7}$~km$^{2}$ \\
	Mean Lifetime & 16.4~min \\
            \noalign{\smallskip}
            \hline
         \end{tabular}
   \end{table}