\begin{table}%T4
\caption{\label{vsiniOO}Determined values of $v \sin~i$~(km~s$^{-1}$)
for the \ion{C}{ii}~4267, \ion{Mg}{ii}~4481 and \ion{Si}{iii}~lines obtained in
1999 using the Fourier transform analysis, compared to the values given
{\revised by B01 for the same data and by~N02 for the data obtained in 1998.}}
%\centering
\par
\begin{tabular}{l l l l }
\hline
\hline
                       & \multicolumn{3}{l}{$v \sin~i$}   \\
                       & N02      & B01   & this paper\\
Data obtained in       & 1998     & 1999  & 1999      \\
\hline
\ion{C}{ii} 4267     & 178      & 214   & 169\\
\ion{Mg}{ii} 4481    & 185      & 233   & 180\\
\ion{Si}{iii} 4553   & 179      & 223   & 165\\
\hline
\end{tabular}
\end{table}