\begin{table}%t4
\caption{\label{tab:orbit}New combined orbit of 41 Dra.}
%\centering
\par
\begin{tabular}{lcc}
\hline\hline
Element   & Value  & Error \\
\hline
Period $P$, days      &    1246.680      &       0.004 \\
Periastron epoch $T$, JD      &  2~449~571.037      &      0.008 \\
Eccentricity  $e$    &      0.9754      &      0.0001 \\
Semi-major axis $a$, arcsec      &      0.0706      &      0.0014 \\
Position angle of node $\Omega_{a}$, deg      &        1.9      &        1.7 \\
Argument of periastron $\omega_{a}$, deg      &      127.31      &        0.13 \\
Inclination $i$, deg      &       49.7      &        2.9 \\
Primary amplitude $K_1$, km~s$^{-1}$     &       44.62      &        0.10 \\
Secondary amplitude $K_2$, km~s$^{-1}$     &       48.06      &        0.11 \\
System velocity $V_0$, km~s$^{-1}$     &        5.76      &        0.05 \\
\hline
Primary mass, $M_\odot$ & 1.28 & 0.15 \\
Secondary mass, $M_\odot$ & 1.20 & 0.14 \\
Orbital parallax, mas & 23.0 & 2.2 \\
\hline
\end{tabular}
\end{table}