\begin{table}%t2
\caption{\label{fe_cts}Measured line counts for Fe~{\sc xvii} lines with 1~$\sigma$ errors.}
%\centering
\par
{\scriptsize
\begin{tabular}{p{.9cm}p{.7cm}ccc|ccc}
\hline\hline
&&\multicolumn{3}{c|}{Fe~{\sc xvii}}&\multicolumn{3}{c}{Ratios}\\
 star &Instr. & 15.03~\AA & 15.27~\AA & 16.78~\AA & 15.27/15.03~\AA& 16.78/15.03~\AA & 15.27/16.78~\AA\\
 \hline
         47~Cas&  RGS2&  506.28~$\pm$~32.80&  215.94~$\pm$~25.97&  419.17~$\pm$~26.64&     0.40~$\pm$~0.05&     0.77~$\pm$~0.07&     0.52~$\pm$~0.07\\
         AB~Dor&  RGS2&  1132.6~$\pm$~48.68&  464.77~$\pm$~39.14&  905.31~$\pm$~40.05&     0.39~$\pm$~0.03&     0.74~$\pm$~0.04&     0.52~$\pm$~0.05\\
 &   MEG&  538.89~$\pm$~24.37&  203.40~$\pm$~15.96&  241.83~$\pm$~16.35&     0.39~$\pm$~0.03&     0.59~$\pm$~0.04&     0.66~$\pm$~0.06\\
 &   HEG&  91.010~$\pm$~9.892&  37.030~$\pm$~6.595&  18.580~$\pm$~4.359&     0.43~$\pm$~0.09&     0.62~$\pm$~0.16&     0.70~$\pm$~0.20\\
         AD~Leo&  RGS2&  429.66~$\pm$~29.84&  159.63~$\pm$~23.61&  380.81~$\pm$~24.73&     0.35~$\pm$~0.05&     0.82~$\pm$~0.07&     0.42~$\pm$~0.06\\
 &  LETG&  313.64~$\pm$~20.17&  133.11~$\pm$~15.45&  189.05~$\pm$~15.70&     0.41~$\pm$~0.05&     0.53~$\pm$~0.05&     0.77~$\pm$~0.11\\
           Algol&  RGS2&  1028.4~$\pm$~49.94&  457.75~$\pm$~40.60&  684.78~$\pm$~39.29&     0.42~$\pm$~0.04&     0.62~$\pm$~0.04&     0.68~$\pm$~0.07\\
 &  LETG&  1134.5~$\pm$~42.19&  378.77~$\pm$~31.01&  698.16~$\pm$~33.95&     0.32~$\pm$~0.02&     0.54~$\pm$~0.03&     0.59~$\pm$~0.05\\
 &   MEG&  621.70~$\pm$~27.55&  226.82~$\pm$~18.68&  294.40~$\pm$~19.00&     0.38~$\pm$~0.03&     0.62~$\pm$~0.04&     0.61~$\pm$~0.06\\
 &   HEG&  104.25~$\pm$~10.66&  39.750~$\pm$~6.837&  13.140~$\pm$~3.780&     0.41~$\pm$~0.08&     0.38~$\pm$~0.11&     1.07~$\pm$~0.35\\
         AR~Lac&  RGS2&  582.06~$\pm$~35.42&  259.47~$\pm$~29.81&  390.62~$\pm$~28.58&     0.42~$\pm$~0.05&     0.62~$\pm$~0.06&     0.67~$\pm$~0.09\\
 &   MEG&  218.91~$\pm$~15.85&  79.000~$\pm$~10.28&  107.15~$\pm$~10.98&     0.37~$\pm$~0.05&     0.64~$\pm$~0.08&     0.58~$\pm$~0.09\\
         AT~Mic&  RGS2&  294.34~$\pm$~24.58&  88.730~$\pm$~18.89&  213.98~$\pm$~19.77&     0.28~$\pm$~0.06&     0.68~$\pm$~0.08&     0.42~$\pm$~0.09\\
         AU~Mic&  RGS2&  857.76~$\pm$~40.54&  336.14~$\pm$~31.18&  477.49~$\pm$~28.79&     0.37~$\pm$~0.03&     0.52~$\pm$~0.04&     0.71~$\pm$~0.07\\
 &   MEG&  217.18~$\pm$~15.51&  78.240~$\pm$~9.768&  90.760~$\pm$~10.07&     0.37~$\pm$~0.05&     0.55~$\pm$~0.07&     0.68~$\pm$~0.11\\
 &   HEG&  28.080~$\pm$~5.613&  7.6600~$\pm$~3.173&  6.9400~$\pm$~2.646&     0.29~$\pm$~0.13&     0.75~$\pm$~0.32&     0.39~$\pm$~0.22\\
    $\beta$~Cet&  RGS2&  752.18~$\pm$~40.03&  286.31~$\pm$~26.32&  619.54~$\pm$~30.46&     0.36~$\pm$~0.03&     0.77~$\pm$~0.05&     0.47~$\pm$~0.04\\
 &  LETG&  3718.0~$\pm$~70.06&  1248.1~$\pm$~45.71&  2008.5~$\pm$~50.64&     0.32~$\pm$~0.01&     0.48~$\pm$~0.01&     0.68~$\pm$~0.03\\
 &   MEG&  1954.0~$\pm$~45.23&  672.90~$\pm$~27.24&  827.40~$\pm$~29.22&     0.36~$\pm$~0.01&     0.56~$\pm$~0.02&     0.64~$\pm$~0.03\\
 &   HEG&  298.67~$\pm$~17.44&  108.19~$\pm$~10.61&  50.690~$\pm$~7.141&     0.39~$\pm$~0.04&     0.51~$\pm$~0.07&     0.75~$\pm$~0.13\\
         Capella&  RGS2&  11967.~$\pm$~145.8&  5284.1~$\pm$~110.5&  9436.1~$\pm$~117.3&     0.42~$\pm$~0.01&     0.73~$\pm$~0.01&     0.57~$\pm$~0.01\\
 &  LETG&  22759.~$\pm$~165.8&  8940.5~$\pm$~111.5&  14024.~$\pm$~124.6&     0.38~$\pm$~0.01&     0.54~$\pm$~0.01&     0.69~$\pm$~0.01\\
 &   MEG&  14047.~$\pm$~120.8&  5343.9~$\pm$~76.05&  6629.4~$\pm$~82.34&     0.40~$\pm$~0.01&     0.62~$\pm$~0.01&     0.64~$\pm$~0.01\\
 &   HEG&  2712.3~$\pm$~52.65&  843.36~$\pm$~29.72&  503.93~$\pm$~22.52&     0.33~$\pm$~0.01&     0.56~$\pm$~0.02&     0.59~$\pm$~0.03\\
   $\chi^1$~Ori&  RGS2&  549.96~$\pm$~30.83&  265.64~$\pm$~24.36&  404.77~$\pm$~24.20&     0.46~$\pm$~0.04&     0.68~$\pm$~0.05&     0.66~$\pm$~0.07\\
         EK~Dra&  RGS2&  280.71~$\pm$~22.36&  54.790~$\pm$~14.60&  210.94~$\pm$~17.96&     0.18~$\pm$~0.05&     0.70~$\pm$~0.08&     0.26~$\pm$~0.07\\
 &  LETG&  204.32~$\pm$~16.49&  65.458~$\pm$~10.53&  102.86~$\pm$~12.91&     0.31~$\pm$~0.05&     0.44~$\pm$~0.06&     0.69~$\pm$~0.14\\
 $\epsilon$~Eri&  RGS2&  230.74~$\pm$~19.67&  123.29~$\pm$~16.27&  185.60~$\pm$~16.44&     0.50~$\pm$~0.08&     0.75~$\pm$~0.09&     0.67~$\pm$~0.10\\
 &  LETG&  1054.9~$\pm$~34.98&  462.69~$\pm$~24.38&  739.58~$\pm$~28.96&     0.42~$\pm$~0.02&     0.62~$\pm$~0.03&     0.68~$\pm$~0.04\\
         EQ~Peg&  RGS2&  134.74~$\pm$~16.70&  59.830~$\pm$~13.14&  123.28~$\pm$~14.43&     0.42~$\pm$~0.10&     0.85~$\pm$~0.14&     0.49~$\pm$~0.12\\
         EV~Lac&  RGS2&  403.93~$\pm$~28.68&  154.06~$\pm$~20.51&  292.15~$\pm$~22.44&     0.36~$\pm$~0.05&     0.67~$\pm$~0.07&     0.53~$\pm$~0.08\\
 &   MEG&  333.57~$\pm$~18.93&  183.79~$\pm$~14.40&  180.05~$\pm$~13.84&     0.57~$\pm$~0.05&     0.71~$\pm$~0.06&     0.81~$\pm$~0.08\\
 &   HEG&  62.580~$\pm$~8.187&  20.190~$\pm$~4.849&  10.800~$\pm$~3.313&     0.34~$\pm$~0.09&     0.52~$\pm$~0.17&     0.66~$\pm$~0.25\\
        HR~1099&  RGS2&  553.53~$\pm$~37.37&  222.57~$\pm$~30.33&  337.93~$\pm$~29.10&     0.38~$\pm$~0.05&     0.57~$\pm$~0.06&     0.67~$\pm$~0.10\\
 &  LETG&  1204.3~$\pm$~42.48&  434.95~$\pm$~31.77&  728.82~$\pm$~36.98&     0.35~$\pm$~0.02&     0.54~$\pm$~0.03&     0.65~$\pm$~0.05\\
 &   MEG&  1227.7~$\pm$~39.05&  445.89~$\pm$~26.59&  644.34~$\pm$~28.31&     0.38~$\pm$~0.02&     0.69~$\pm$~0.03&     0.54~$\pm$~0.04\\
 &   HEG&  240.44~$\pm$~16.57&  72.760~$\pm$~10.13&  43.570~$\pm$~7.306&     0.32~$\pm$~0.05&     0.55~$\pm$~0.10&     0.59~$\pm$~0.12\\
   $\kappa$~Cet&  RGS2&  550.57~$\pm$~31.34&  312.80~$\pm$~27.04&  619.60~$\pm$~29.86&     0.53~$\pm$~0.05&     1.05~$\pm$~0.07&     0.51~$\pm$~0.05\\
  $\lambda$~And&  RGS2&  478.78~$\pm$~33.93&  197.61~$\pm$~28.29&  336.44~$\pm$~28.02&     0.39~$\pm$~0.06&     0.65~$\pm$~0.07&     0.59~$\pm$~0.09\\
 &   MEG&  558.06~$\pm$~25.05&  201.97~$\pm$~16.07&  241.32~$\pm$~16.13&     0.38~$\pm$~0.03&     0.57~$\pm$~0.04&     0.66~$\pm$~0.06\\
 &   HEG&  58.620~$\pm$~7.790&  23.100~$\pm$~4.943&                   -- &     0.42~$\pm$~0.10&                   -- &      --\\
    $\pi^1$~UMa&  RGS2&  450.19~$\pm$~27.04&  176.91~$\pm$~21.40&  323.24~$\pm$~21.57&     0.37~$\pm$~0.05&     0.67~$\pm$~0.06&     0.55~$\pm$~0.07\\
         Procyon&  LETG&  101.56~$\pm$~13.37&  38.450~$\pm$~10.07&  59.030~$\pm$~11.56&     0.37~$\pm$~0.10&     0.51~$\pm$~0.12&     0.71~$\pm$~0.23\\
   $\sigma$~CrB&  RGS2&  1626.6~$\pm$~56.60&  673.04~$\pm$~41.30&  1009.9~$\pm$~40.78&     0.39~$\pm$~0.02&     0.58~$\pm$~0.03&     0.67~$\pm$~0.05\\
         UX~Ari&  RGS2&  220.17~$\pm$~27.35&  73.050~$\pm$~20.96&  211.92~$\pm$~24.48&     0.31~$\pm$~0.09&     0.90~$\pm$~0.15&     0.35~$\pm$~0.10\\
 &  LETG&  497.87~$\pm$~29.79&  151.85~$\pm$~22.32&  277.58~$\pm$~23.61&     0.29~$\pm$~0.04&     0.49~$\pm$~0.05&     0.59~$\pm$~0.10\\
 &   MEG&  219.83~$\pm$~16.26&  79.050~$\pm$~10.85&  92.730~$\pm$~10.55&     0.37~$\pm$~0.05&     0.55~$\pm$~0.07&     0.67~$\pm$~0.12\\
         VY~Ari&  RGS2&  291.14~$\pm$~26.33&  90.040~$\pm$~20.14&  161.97~$\pm$~19.96&     0.29~$\pm$~0.07&     0.52~$\pm$~0.08&     0.56~$\pm$~0.14\\
         YY~Gem&  LETG&  252.48~$\pm$~18.17&  92.900~$\pm$~12.66&  139.56~$\pm$~14.36&     0.35~$\pm$~0.05&     0.49~$\pm$~0.06&     0.72~$\pm$~0.12\\
         YZ~CMi&  RGS2&  163.75~$\pm$~18.27&  97.110~$\pm$~16.44&  145.15~$\pm$~15.44&     0.56~$\pm$~0.11&     0.82~$\pm$~0.12&     0.67~$\pm$~0.13\\
\hline
\end{tabular}
}
\end{table}