\begin{table}%t1
%\centering
\par
\caption{Morphological and physical parameters as determined in this work for the Carina, Sculptor and Fornax dSphs.}\label{t:param}
\begin{tabular}{llll}
\hline\hline
Parameter                   & Carina                & Sculptor              & Fornax                \\[0.5ex]
\hline
$\alpha$ [J2000]            & $6 \mbox{h} 41' 34''$ & $1 \mbox{h} 00' 28''$ & $2 \mbox{h} 40' 4''$  \\
$\delta$ [J2000]            & $-50^{\circ} 57'$     & $-33^{\circ} 42'$     & $-34^{\circ} 31'$     \\
PA       [$^{\circ}$]       & $64\pm 2.5$           & $98\pm 2$             & $40\pm 5$             \\  
e                           & $0.32\pm 0.04$        & $0.2\pm 0.05$         & $0.3\pm 0.05$         \\
$r_0^{\rm emp}$ [arcmin]        & $11.96 \pm 1.5$       & $7.56 \pm 0.7$        & $13 \pm 0.15$         \\
$r_t^{\rm emp}$ [arcmin]        & $22.54 \pm 1.4$       & $40 \pm 4$            & $89 \pm 17$           \\
$c^{\rm emp}$                   & $0.27 \pm 0.08$       & $0.72 \pm 0.2$        & $0.83 \pm 0.1$        \\
$(\Psi/\sigma^2)^{\rm theo}$    & 1.2                   & 2.7                   & 3.8                   \\
$r_0^{\rm theo}$ [arcmin]       & 14                    & 10                    & 15                    \\
$r_t^{\rm theo}$ [arcmin]       & 33.5                  & 44                    & 98                    \\
$c^{\rm theo}$                  & 0.38                  & 0.64                  & 0.82                  \\
$L_V^{\rm tot}$ [$10^5~L_{\odot}$]   & $(3.45 \pm 0.5) $ & $(5.6 \pm 0.5)$     & $(88 \pm 0.5)$        \\
$M^{{V}}$ [mag]        & $-$9.0                  & $-$9.5                  & $-$12.5    \\
\hline
\end{tabular}
\end{table}