\begin{table}%t1
\caption{\label{tab1}\js, $H$ and \ks~photometry of the Crab pulsar and its 
nearest neighbors$^{a}$.}
%%%\centerline
\par
{
\begin{tabular}{lccc}
\hline\hline\noalign{\smallskip}
Offsets from Pulsar & \js\ & $H$ & \ks\ \\
 (arcsec) & & & \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
Crab Pulsar~& 14.80 &  14.27 & 13.77 \\
6.29~~N,~~20.37~E & 14.64 &  14.26 & 14.14 \\
3.82~~N,~~3.24~~E & 14.08 &  13.75 & 13.65 \\
5.84~~S,~~0.51~~W & 16.14 &  15.41 & 15.24 \\
10.58~S,~~2.29~~E & 15.29 &  14.90 & 14.80 \\
12.43~S,~~1.05~~E & 16.50 &  16.11 & 16.06 \\
\hline
\end{tabular}}
\smallskip
\hspace*{16mm}$^a$ \ The errors are $\lsim$0.05~mag in all bands. 
\end{table}