\begin{table}%t1
      \caption{\label{table1}For various correlation length the probability  that the maximum intensity
                  of an individual random spectrum exceeds a certain value is given. For 
                  all cases the peak intensities are compared to the intensity expectation 
                  value in the line center as calculated from the parameter configuration
                  given in Fig.~\ref{fig2}.}
                    %\centering
\par
           \begin{tabular}{rrrr}
            \hline\hline
            \noalign{\smallskip}
            Greater than & $L/l=10$ & $L/l=25$ & $L/l=50$ \\
            \noalign{\smallskip}
            \hline
            \noalign{\smallskip}
           $0.1\cdot \left\langle I_{\Delta\nu~=~0}\right\rangle $ & 69.2\% &   37.3\% &   15.7\%  \\
           $1\cdot\left\langle I_{\Delta\nu~=~0}\right\rangle$      & 28.0\%      & 3.5\%     & 0.13\%\\
           $10\cdot \left\langle I_{\Delta\nu~=~0}\right\rangle$      & 6.5\%      & 0.06\%      & 0.0\% \\
           $100\cdot \left\langle I_{\Delta\nu~=~0}\right\rangle$ &      0.9\% &      0.0\%    & 0.0\%  \\
            \hline
            \end{tabular}
               \end{table}