\begin{table}%t1
\caption{\label{tavola1}Results of the stability analysis on the INT data extension
of the selected MDM microlensing candidates. For each MDM light curve (T and C stand
respectively for Target, where we use the same numeration used in \cite{mdm02},
and Control) for which we find an astrometrically compatible INT bump, we report  
the number of standard deviation within which the position and 
the bump parameters (duration and flux deviation in both bands
as calculated from independent Paczy\'nski fits on each of the MDM and INT light curves), 
of the two variations are compatible.}
%\centering
\par
\begin{tabular}{ccccc}
\hline\hline
id & $\sigma$(position) & $\sigma(t_{1/2})$ & $\sigma(\Delta\Phi_R)$ & $\sigma(\Delta\Phi_I)$  \\
\hline
T1 & 1 & 1 & 2 & 2 \\
T2 & 1 & 1 & 1 & 2 \\
T3 & 1 & 4 & 4 & 3 \\
T4 & 1 & 4 & 5 & 3 \\
T5 & 1 & 3 & 2 & 3 \\
T6 & 1 & 2 & 1 & 1  \\    
\hline
C1 & 1 & 1 & 2 & 4 \\
C2 & 1 & 2 & 2 & 2\\
\hline
\end{tabular}
\end{table}