\begin{table}%t9
%\centering
\par
         \caption{Results for a highly distorted 
                  homogeneous configuration at the mass shedding limit
			with $\bar{p}_{\rm c}=0.003$.
	     For the meaning of the quantities, see Table~\ref{t1}.}\label{t9}
   \begin{tabular}{lllll}\hline\hline
     \multicolumn{2}{c}{}&\multicolumn{1}{c}{$m=10$}&
     \multicolumn{1}{c}{$m=16$}&\multicolumn{1}{c}{$m=22$}\\ \hline
$\bar{p}_{\rm c}$     &   0.003      &   &  & \\
$r_{\rm p}/r_{\rm e}$ &   0.04534    & 1.1e-02  & 1.3e-03 & 1.3e-04\\
$\bar{\Omega}$        &   0.9883     & 1.5e-03  & 3.9e-05 & 1.9e-06\\
$\bar{M}$             &   0.03900    & 6.9e-03  & 9.8e-04 & 5.5e-05\\
$\bar{R}_{\rm circ}$  &   0.4005     & 2.5e-03  & 6.9e-05 & 2.3e-05\\
$\protect\bar{J}$             &   0.002717   & 1.2e-02  & 1.7e-03 & 9.5e-05\\
$Z_{\rm p}$           &   0.2388     & 4.8e-03  & 7.8e-04 & 4.4e-05\\ \hline
$GRV2$&                              & 6.2e-05  & 2.3e-05 & 5.9e-06 \\ 
$GRV3$&                              & 1.3e-04  & 3.0e-05 & 7.3e-06 \\
$|1-M_{\rm in}/M_{\rm out}|$&        & 1.5e-04  & 2.1e-05 & 4.6e-06\\
$|1-J_{\rm in}/J_{\rm out}|$&        & 2.0e-03  & 1.3e-05 & 8.8e-06\\
          \hline
         \end{tabular}
\end{table}