\begin{table} %t3
\caption{Central CO and CI line intensities in IC~342 and Maffei~2.}\label{tab3}
%\centerline
{
\begin{tabular}{llrrccrcc}
\hline
\hline
& & & \multicolumn{3}{l}{IC~342} & \multicolumn{3}{l}{Maffei~2} \\
\multicolumn{2}{l}{Transition} & Resolution  
& $T_{\rm mb}$$^a$ & $\int T_{\rm mb}$d$V^a$ & $L_{\rm tot}$$^b$ 
& $T_{\rm mb}$$^a$ & $\int T_{\rm mb}$d$V^a$ & $L_{\rm tot}$$^b$ \\
&       & ($\arcsec$)       & (mK) & ($\kkms$)  & $\kkms$ kpc$^{2}$
			    & (mK) & ($\kkms$)  & $\kkms$ kpc$^{2}$ \\
\hline
$\co$   & $J=2{-}1$ & 21 & 3090 & $172\pm19$ & 15.4 & 1500   & $245\pm35$ & 11.6 \\
        &	   & 43 &      &  $98\pm14$ &	    &        	    & $106\pm15$ &  \\
        & $J=3{-}2$ & 14 & 3140 & $186\pm23$ & 10.4 & 1650   & $295\pm35$ &  7.6 \\
        &	   & 21 &      & $126\pm13$ &	    &        	    & $165\pm15$ &  \\
        & $J=4{-}3$ & 11 & 4020 & $209\pm21$ &  4.6 & 1950   & $405\pm50$ &  5.7 \\
        &	   & 14 &      & $176\pm19$ &	   &	    & $280\pm35$ &  \\
        &	   & 21 &      & $115\pm14$ &	   &	    & $160\pm25$ &  \\
\noalign{\smallskip}
${\rm ^{13}CO}$ & $J=2{-}1$ & 21 &  476 & $24.0\pm3$ & ---  &  150   & $22\pm4$  &   --- \\
	&	   & 43 &      & $12.0\pm2$ &	   &	    &	---     &   \\
	& $J=3{-}2$ & 14 &  311 & $17.1\pm2$ & ---  &  200   & $20\pm4$  &   ---\\
	&	   & 21 &      & $14.4\pm2$ &      &        &	---     &   \\
\noalign{\smallskip}
[CI] & $^{3}P_{1}{-}^{3}P_{0}$ 
                   & 10 & 1030 & $54\pm6$   &  1.0 &  190   & $37\pm7$  & --- \\
	&          & 14 &      & $42\pm8$   &	   &        &   ---     & \\
	&          & 21 &      & $27\pm7$   &	   &        &   ---     & \\
\hline
\end{tabular}}
\medskip
$^{a}$ Beam centered on nucleus. \\
$^{b}$ Total central concentration.
\end{table}