\begin{table}%t1
%\centering
\par
\caption{Corrections to the nominal values of various parameters formerly fit 
to DE200, resulting from the comparison of ELP/MPP02 to DE405 and LLR. \protect\\
Fit to DE405: [+1950;~+2060]; 40000 days; initial epoch: 1/1/1950~(0h);
number of abscissa: 2000. \protect\\
Fit to LLR: [+1972;~+2001];  14500 observations; 4~observing stations. \protect\\
The corrections are given in arcsecond except for~$\nu$, $n'$, $w_2^{(1)}$, $w_3^{(1)}$ in arcsecond/cy and $w_1^{(2)}$ 
in arcsecond/cy$^{2}$.\label{tab1}}
\begin{tabular}{lcc} 
\hline \hline  
Corrections &DE405 &LLR \\
\hline 
\textit{Orbital parameters} & & \\
$\Delta w_1^{(0)}$          &  $-$0.07008  &  $-$0.10525 \\   
$\Delta w_2^{(0)}$          &  +0.20794    &   +0.16826  \\
$\Delta w_3^{(0)}$          & $-$0.07215   &  $-$0.10760 \\
$\Delta \nu$                & $-$0.35106   &  $-$0.32311 \\
$\Delta \Gamma$             &  +0.00085    &   +0.00069  \\
$\Delta E$                  &  $-$0.00006  &   +0.00005  \\
$\Delta T^{(0)}$            &  $-$0.00033  &  $-$0.04012 \\
$\Delta \varpi'^{(0)}$      &  $-$0.00749  &  $-$0.04854 \\
$\Delta n'$                 &  +0.00732    &   +0.01442  \\
$\Delta e'$                 &  +0.00224    &   +0.00226  \\
&& \\ 
$\Delta w_2^{(1)}$          &  +0.08017    &             \\
$\Delta w_3^{(1)}$          &  $-$0.04317  &             \\
$\Delta w_1^{(2)}$          &  $-$0.03743  &  $-$0.03794 \\
\hline 
\textit{Reference frame}    &              &             \\
$\Delta \phi$               &  +0.04180    &   +0.07730  \\
$\Delta \epsilon$           &  +0.00000    & $-$0.00316  \\
\hline
\end{tabular}
\end{table}