\begin{table}%T3
%\centering
\par
\caption{ Cross-identification of the  WENSS and NVSS catalogs with source selection at 
1.4~GHz.}\label{tab3}
\small{
\begin{tabular}{crrrr}
\hline\hline
$\rm Med\_flux(1400)$ &NVSS  &  WENSS & total ident. & PFSS\\
(Jy)&  &  & ratio \% & \% \\
\hline%\\[-3.2mm]
$\rm  0.024_{.016}^{.032}$ & 61~378 & 55~277 & 90 & 13 \\
$\rm  0.048^{.032}_{0.064}$ & 34~492 & 33~133 & 96 & 12 \\
$\rm  0.096^{.064}_{0.128}$ & 17~954 & 17~448 & 97 & 12 \\
$\rm  0.192^{.128}_{0.256}$ & 8669 & 8406 & 97 & 13 \\
$\rm  0.384^{.256}_{0.512}$ & 3511 & 3371 & 96 & 15 \\
$\rm  0.768^{.512}_{1.024}$ & 1386 & 1285 & 93 & 18.8 \\
$\rm  1.536^{1.024}_{2.048}$ & 417 & 363 & 87 & 21.3 \\
$\rm  3.072^{2.048}_{4.096}$ & 151 & 125 & 83 & 24.5 \\
\hline
\end{tabular}
}
\end{table}