\begin{table}%T3
 %\centering
\par
   \caption{The 1.4 GHz radio source counts for the VIRMOS survey.}
     \label{counts_tab}
 \begin{tabular}{ccccccc}
     \hline
     \hline
\par
$S$  & $<S>$ & $N_S$ & ${\rm d}N/{\rm d}S$             & $nS^{2.5}$          & $C$  &  $N(>$$S)$ \\
(mJy) & (mJy) &       & sr$^{-1}$ Jy$^{-1}$ & sr$^{-1}$ Jy$^{1.5}$ &      &deg$^{-2}$ \\
\hline
 0.08--0.12 &   0.10 & 346 & $3.07\times10^{10}$ & 2.91~$\pm$~0.16   &  1.29&1200  \\
 0.12--0.18 &   0.15 & 205 & $1.12\times10^{10}$ & 2.94~$\pm$~0.21   &  1.25&~718  \\
 0.18--0.27 &   0.22 & 167 & $6.09\times10^9$    & 4.40~$\pm$~0.34   &  1.00&~462  \\
 0.27--0.41 &   0.33 &  99 & $2.41\times10^9$    & 4.79~$\pm$~0.48   &  1.00&~295  \\
 0.41--0.61 &   0.50 &  58 & $9.40\times10^8$    & 5.15~$\pm$~0.68   &  1.00&~196  \\
 0.61--0.91 &   0.74 &  42 & $4.54\times10^8$    & 6.85~$\pm$~1.06   &  1.00&~138  \\
 0.91--1.37 &   1.12 &  25 & $1.80\times10^8$    & 7.50~$\pm$~1.50   &  1.00&~~96  \\
 1.37--2.05 &   1.67 &  18 & $8.65\times10^7$    & 9.91~$\pm$~2.34   &  1.00&~~71  \\
 2.05--3.08 &   2.51 &  17 & $5.44\times10^7$    & 17.20~$\pm$~4.17   &  1.00&~~53  \\
 3.08--4.61 &   3.77 &  12 & $2.56\times10^7$    & 22.31~$\pm$~6.44   &  1.00&~~36  \\
 4.61--6.92 &   5.65 &   6 & $8.54\times10^6$    & 20.49~$\pm$~8.37   &  1.00&~~24  \\
 6.92--10.38 &   8.48 &   7 & $6.64\times10^6$    & 43.92~$\pm$~16.60   &  1.00&~~18  \\
 10.38--15.57 &  12.71 &   4 & $2.53\times10^6$    & 46.10~$\pm$~23.05   &  1.00&~~11 \\
 15.57--119.23 &  42.91 &   7 & $2.24\times10^5$    & 85.32~$\pm$~32.24   &  1.00&~~~7  \\
\hline
\end{tabular}
\end{table}