\begin{table}%t2
\caption{continued.} 
%\centerline
{
\begin{tabular}{lccccccc}
\hline\hline
\multicolumn{1}{c}{1} & \multicolumn{1}{c}{9} & \multicolumn{1}{c}{10} & \multicolumn{1}{c}{11} &
\multicolumn{1}{c}{12} & \multicolumn{1}{c}{13} & \multicolumn{1}{c}{14} & \multicolumn{1}{c}{15} \\
\hline
\multicolumn{1}{c}{No.} & \multicolumn{1}{c}{$HR1$} & \multicolumn{1}{c}{$HR2$} & \multicolumn{1}{c}{$HR3$} & 
\multicolumn{1}{c}{$P$} & \multicolumn{1}{c}{$d_{\rm O}$} & \multicolumn{1}{c}{OGLE name} & \multicolumn{1}{c}{[MA93]}\\
\multicolumn{1}{c}{} & \multicolumn{1}{c}{} & \multicolumn{1}{c}{} &
\multicolumn{1}{c}{} & \multicolumn{1}{c}{[s]} & 
\multicolumn{1}{c}{[\arcsec]} &\multicolumn{1}{c}{} & \multicolumn{1}{c}{} \\
\hline
01 &+0.15 $\pm$ 0.20 &+0.09 $\pm$ 0.18 &--1.00 $\pm$ 0.26 &  --                              & --  & --                &  --  \\
[1.5mm]                                                                 
02 & --            & --            & --             &  too weak                        & --  & --                & --   \\
[1.5mm]
03 &+0.41 $\pm$ 0.12 &--0.03 $\pm$ 0.11 &--0.30 $\pm$ 0.17&  59.00 $\pm$ 0.02                  & 1.2 & 00545617--7226476 &  810 \\
[1.5mm]
04 &+1.00 $\pm$ 0.23 &--0.15 $\pm$ 0.17 &--0.13 $\pm$ 0.25&  140.1 $\pm$ 0.3*                  & --  & --                &  904 \\
[1.5mm]
05 &+0.49 $\pm$ 0.05 &--0.29 $\pm$ 0.05 &--0.36 $\pm$ 0.08& --                               & 1.8 & 00571981--7225337 & --   \\
[1.5mm]
06 &+0.45 $\pm$ 0.11 & +0.04 $\pm$ 0.09 &--0.41 $\pm$ 0.11&                                  & 1.9 &                   &      \\[0.01mm]
%\noalign{\smallskip}
06a&+0.80 $\pm$ 0.31 & +0.10 $\pm$ 0.26 &--0.54 $\pm$ 0.43& {--} & 3.5 & {00573601--7219339}& {1020} \\    
[1.5mm]
07 &+0.19 $\pm$ 0.09 & +0.03 $\pm$ 0.08 &--0.14 $\pm$ 0.10&  281.1 $\pm$ 0.2                   & --  & --                & 1036 \\
[1.5mm]
08 &+0.48 $\pm$ 0.07 & +0.25 $\pm$ 0.05 &--0.06 $\pm$ 0.06& 152.34 $\pm$ 0.05*                 & --  & --                & 1038 \\
[1.5mm]
09 &+1.00 $\pm$ 0.33 & +0.44 $\pm$ 0.21 & +0.51 $\pm$ 0.13& --                               & 4.5 & 00581258--7230485 & --   \\
[1.5mm]
10 &+0.49 $\pm$ 0.07 &--0.15 $\pm$ 0.07 &--0.21 $\pm$ 0.10&                                  & 1.2 &                   &      \\[0.01mm]
%\noalign{\smallskip}
10a&+0.27 $\pm$ 0.09 &--0.05 $\pm$ 0.09 & +0.12 $\pm$ 0.09&  {--}& 1.4 & {00592103--7223171}& {--} \\
[1.5mm]
11 &+0.18 $\pm$ 0.14 &--0.19 $\pm$ 0.14 &--0.46 $\pm$ 0.21& --                               & --  &  --               & --   \\
[1.5mm]
12 &+1.00 $\pm$ 0.13 &--0.37 $\pm$ 0.29 & +0.01 $\pm$ 0.52&  --                              & --  &  --               & 1208 \\         
[1.5mm]
13 &+0.37 $\pm$ 0.29 &--0.30 $\pm$ 0.25 & +0.06 $\pm$ 0.41&                                  &     &                   &      \\[0.01mm]
%\noalign{\smallskip}
13a&--0.25 $\pm$ 0.36 &--0.21 $\pm$ 0.48 &+0.40 $\pm$ 0.41& {--} & {--} & {--}& {1240} \\
[1.5mm]                                                     
14 &+0.14 $\pm$ 0.08 & +0.21 $\pm$ 0.07 & +0.06 $\pm$ 0.07&  452.2 $\pm$ 0.5                   & 2.6 &                   &      \\[0.01mm]
%\noalign{\smallskip}
14a&+0.26 $\pm$ 0.12 & +0.06 $\pm$ 0.12 &--0.10 $\pm$ 0.15& too weak                         & 2.2 & {01012064--7211187}& {1257} \\
[1.5mm]                                                    
15 &+0.17 $\pm$ 0.10 &--0.23 $\pm$ 0.10 &--0.20 $\pm$ 0.16&                                  &     &                   &      \\[0.01mm]
%\noalign{\smallskip}
15a&+0.17 $\pm$ 0.13 &--0.36 $\pm$ 0.12 &--0.26 $\pm$ 0.30& {--} &{--} &{--} &{1277}  \\
[1.5mm]                                                  
16 &+0.16 $\pm$ 0.07 & +0.11 $\pm$ 0.06 & +0.00 $\pm$ 0.06&  341.7 $\pm$ 0.4                   & --  & --                & 1367 \\
[1.5mm]                                                  
17 &+0.28 $\pm$ 0.03 & +0.18 $\pm$ 0.02 & +0.07 $\pm$ 0.02& --                               & --  & --                & 1393 \\
[1.5mm]                                                
18 &--0.19 $\pm$ 0.18 & +0.12 $\pm$ 0.18 &+0.22 $\pm$ 0.16& --                               & --  & --                & 1557 \\    
\hline
\end{tabular}}       
\medskip
Notes to Cols.~9--11:
Hardness ratios as defined in Eq.~(\ref{hr123}). \\
Notes to Col.~12:
Pulse periods from timing analysis. * New X-ray binary pulsar!  \\
Notes to Col.~13:
Distance to OGLE object.  \\
Notes to Col.~15:
Entry numbers in Meyssonnier \& Azzopardi (\cite{1993AetAS..102..451M}).
\end{table}