\begin{table}%T2
\caption{\label{tab2}Point source detections.}
%\centerline
{
\begin{tabular}{lrrrrrrrl}
\hline\hline\noalign{\smallskip}
Name&\multicolumn{2}{c}{Position in B1950}&&\multicolumn{2}{c}{Position
  in J2000}&$v_{\rm system}$&Flux &Reference\\
    &(RA)  &(Dec)    &&(RA)  &(Dec)    &          (\kms)&(mJy)& \\
\noalign{\smallskip}\hline\noalign{\smallskip}
\multicolumn{8}{l}{\bf OH 1612 MHz masers}\\
OH359.825$-$0.024&17 42 06.961 & $-$29 04 40.90&&17 45 17.824 & $-$29 05 52.10 &$-$56&  190&L-92 (47)\\
OH359.924$+$0.034&17 42 08.300 & $-$28 57 44.95&&17 45 18.987 & $-$28 58 56.05 &$-$83&   72&L-92 (60)\\
OH359.990$+$0.030&17 42 18.210 & $-$28 54 32.29&&17 45 28.817 & $-$28 55 42.66 &$-$65&   64&S-98\\
OH359.906$-$0.036&17 42 21.493 & $-$29 00 54.62&&17 45 32.262 & $-$29 02 04.73 &$-$47&   40&S-98\\
OH359.888$-$0.051&17 42 22.486 & $-$29 02 19.15&&17 45 33.292 & $-$29 03 29.21 &$-$56&   62&L-92 (53)\\
OH359.906$-$0.041&17 42 22.714 & $-$29 01 05.75&&17 45 33.488 & $-$29 02 15.76 &$-$138& 284&L-92 (58)\\
OH359.855$-$0.078&17 42 23.935 & $-$29 04 51.52&&17 45 34.805 & $-$29 06 01.43 &   +3&  129&L-92 (50)\\
OH359.911$-$0.059&17 42 27.482 & $-$29 01 22.96&&17 45 38.264 & $-$29 02 32.61 &$-$79&   54&L-92 (59)\\
OH359.918$-$0.055&17 42 27.700 & $-$29 00 53.27&&17 45 38.469 & $-$29 02 02.89 &$-$292& 299&S-98\\
OH359.952$-$0.036&17 42 27.897 & $-$28 58 35.23&&17 45 38.608 & $-$28 59 44.83 &  +85&  289&L-92 (66)\\
OH359.954$-$0.041&17 42 29.463 & $-$28 58 37.61&&17 45 40.175 & $-$28 59 47.09 &  +71&  731&L-92 (67)\\
OH359.880$-$0.087&17 42 29.641 & $-$29 03 52.92&&17 45 40.486 & $-$29 05 02.37 &$-$20& 1085&L-92 (52)\\
OH359.946$-$0.047&17 42 29.892 & $-$28 59 13.47&&17 45 40.619 & $-$29 00 22.89 &$-$24&  145&L-92 (65)\\
OH359.939$-$0.052&17 42 29.919 & $-$28 59 45.56&&17 45 40.659 & $-$29 00 54.97 &  +53&  256&L-92 (63)\\
OH359.932$-$0.059&17 42 30.575 & $-$29 00 16.96&&17 45 41.329 & $-$29 01 26.38 &$-$156&  44&S-98\\
OH359.932$-$0.063&17 42 31.383 & $-$29 00 27.57&&17 45 42.141 & $-$29 01 36.86 &$-$92&  286&L-92 (61)\\
OH359.970$-$0.049&17 42 33.681 & $-$28 58 03.05&&17 45 44.381 & $-$28 59 12.31 &  +89&   39&L-92 (69)\\
OH359.985$-$0.042&17 42 34.034 & $-$28 57 04.34&&17 45 44.707 & $-$28 58 13.46 &$-$11&   28&S-98\\
OH359.938$-$0.077&17 42 35.685 & $-$29 00 36.57&&17 45 46.447 & $-$29 01 45.54 &$-$83& 2408&L-92 (62)\\
OH359.902$-$0.103&17 42 36.608 & $-$29 03 13.52&&17 45 47.439 & $-$29 04 22.56 &$-$102&  44&S-98\\
OH\x .030$-$0.026&17 42 36.999 & $-$28 54 17.89&&17 45 47.602 & $-$28 55 26.76 &$-$56&   70&S-98\\
OH359.986$-$0.061&17 42 38.742 & $-$28 57 39.90&&17 45 49.430 & $-$28 58 48.63 &  +16&  246&L-92 (73)\\
OH359.980$-$0.077&17 42 41.720 & $-$28 58 27.08&&17 45 52.428 & $-$28 59 35.59 &  +89&   40&S-98\\
OH359.977$-$0.087&17 42 43.616 & $-$28 58 53.52&&17 45 54.336 & $-$29 00 01.88 &  +12&  220&L-92 (72)\\
OH\x .040$-$0.056&17 42 45.477 & $-$28 54 42.46&&17 45 56.091 & $-$28 55 50.68 &  +71&  147&L-92 (81)\\
OH\x .007$-$0.088&17 42 48.232 & $-$28 57 26.00&&17 45 58.915 & $-$28 58 34.00 &   +3&   76&L-92 (77)\\
OH\x .053$-$0.062&17 42 48.853 & $-$28 54 14.07&&17 45 59.458 & $-$28 55 22.21 &   +7&   26&L-92 (82)\\
OH359.971$-$0.119&17 42 50.180 & $-$29 00 14.39&&17 46 00.935 & $-$29 01 22.24 &$-$11&  227&L-92 (70)\\
OH359.936$-$0.144&17 42 51.127 & $-$29 02 49.22&&17 46 01.947 & $-$29 03 56.99 &$-$11&   61&L-92 (7-s)\\
\\
\multicolumn{8}{l}{\bf OH 1665 MHz masers}\\
OH359.880$-$0.087&17 42 29.628 & $-$29 03 52.91&&17 45 40.472 & $-$29 05 02.27 & $-$29&   30&\\
OH359.938$-$0.077&17 42 35.678 & $-$29 00 36.25&&17 45 46.440 & $-$29 01 45.16 & $-$91&   35&\\
\\
\multicolumn{8}{l}{\bf OH 1667 MHz masers}\\
OH359.952$-$0.036&17 42 27.907 & $-$28 58 35.21&&17 45 38.618 & $-$28 59 44.75 &   +63&   37&\\
OH359.880$-$0.087&17 42 29.597 & $-$29 03 53.40&&17 45 40.442 & $-$29 05 02.80 & $-$29&  103&\\
OH359.938$-$0.077&17 42 35.682 & $-$29 00 36.55&&17 45 46.444 & $-$29 01 45.50 & $-$82&  106&\\
OH359.977$-$0.087&17 42 43.647 & $-$28 58 53.57&&17 45 54.367 & $-$29 00 01.94 &  $-$3&   29&\\
\\
\multicolumn{8}{l}{\bf OH 1720 MHz masers}\\
OH359.930$-$0.049&17 42 28.017 & $-$29 00 05.83&&17 45 38.764 & $-$29 01 15.27 &$-$132&   70&YZ01\\
OH359.952$-$0.036&17 42 28.181 & $-$28 58 31.47&&17 45 38.888 & $-$28 59 40.89 &   +47&  118&YZ96 (C)\\
OH359.955$-$0.040&17 42 29.666 & $-$28 58 32.18&&17 45 40.374 & $-$28 59 41.48 &  +132&  290&YZ96 (B)\\
OH359.960$-$0.037&17 42 29.705 & $-$28 58 09.87&&17 45 40.403 & $-$28 59 19.16 &   +30&   37&\\
OH359.955$-$0.042&17 42 29.913 & $-$28 58 34.44&&17 45 40.621 & $-$28 59 43.71 &  +132&  658&YZ96 (B)\\
OH359.928$-$0.062&17 42 30.843 & $-$29 00 37.40&&17 45 41.603 & $-$29 01 46.59 &   +56&  131&YZ96 (G)\\
OH359.934$-$0.066&17 42 32.616 & $-$29 00 23.40&&17 45 43.371 & $-$29 01 32.45 &   +56&  248&YZ96 (D,E,F)\\
OH359.939$-$0.067&17 42 33.588 & $-$29 00 09.07&&17 45 44.337 & $-$29 01 18.04 &   +64& 1290&YZ96 (A)\\
OH359.966$-$0.056&17 42 34.878 & $-$28 58 28.00&&17 45 45.586 & $-$28 59 37.03 &   +39&   75&\\
OH359.977$-$0.069&17 42 39.462 & $-$28 58 19.67&&17 45 50.165 & $-$28 59 28.20 &   +56&   93&\\
\hline
\end{tabular}}
\end{table}