\begin{table}%t5
%\centering
\par
\caption{Absolute dimensions of IU~Aur according to the new
photometric solution of Table~\ref{SOLUTION}.}
%
\label{ABSDIM}
\begin{tabular}{lll}
%\hline
%& \multicolumn{2}{c}{IU~Aur} & \multicolumn{2}{c}{$3^{\rm rd}$ component}\\[1mm]
\hline\hline\noalign{\smallskip}
Parameter            & Primary        & Secondary                   \\[1mm]
\hline\noalign{\smallskip}
$M~(M_{\odot})$       & $21.4 \pm 2.5$ & $14.5 \pm 2$                \\
$R~(R_{\odot})$       & $7.8 \pm 0.8$ & $7.1 \pm 0.8$                \\
$T~(\rm K)$          & 32~000        & $27~540 \pm 290$           \\
$\log(L)~(L_{\odot})$ & $4.76 \pm 0.04$ & $4.42 \pm 0.05$            \\
$a~(R_{\odot})$\footnote{adopted from DHLM.}
                     & $ 8.3 \pm 0.2$ & $ 12.3 \pm 0.8$             \\
$<\rho>~(\rm cgs)$   & $ 0.06 \pm 0.05$ & $ 0.06 \pm 0.05$          \\
$\log g~(\rm cgs)$   & $ 3.99 \pm 0.17$ & $ 3.89 \pm 0.19$          \\
$M_{V}~(^{\rm m})$      & $-3.72\pm0.05$ & $-2.80\pm0.11$  \\[1mm]
\hline
%%%HD $d~$(pc)             & $ 2000 $ & $ 1900 $ \\[1mm]
%\hline
\end{tabular}
\end{table}