\begin{table}%T3
%\centering
\par
\caption{Line identification and equivalent widths (given in {\AA}) between $\sim$1.1--1.8~$\mu$m for \object{AFGL~2298} between
2001 August (PC02) and 2002 May. We estimate errors to be $\pm$20~per cent of the quoted~$EW$. Note that within the observational uncertainty
 no variability was apparent over the 3.5~month period between 2002 May--July.\label{tab3}}
\begin{tabular}{lcc}
\hline\hline
Date        & 08/01 & 05/02\\
Transition  &      &           \\  
\hline
Pa$\beta$ & -- &250 \\
Br13& -- & 20 \\
Br12& 10 &31 \\
Br11 +& 50 & 120 \\
Fe~{\sc ii}(z$^4${F}$_{9}$ - c$^4$F$_{7}$) 1.6787& bl &bl \\
Br10& 25 & 80 \\
\hline
\end{tabular}
\end{table}