\begin{table}%t1
%\centering
\par
      \caption{VLT observations of \ctq.\label{tbl-1}}
         $$
         \begin{tabular}{lccr}
            \hline\hline
            \noalign{\smallskip}
{\rm Mode}&{\rm Wavelength}&{\rm Exp. Time}&{\rm Observing Date}\\
              &[nm]           &  [s]        &                    \\
            \noalign{\smallskip}
            \hline
            \noalign{\smallskip}
FORS2 (GRISM 600B)  &345--590&600&Dec. 18 2000\\
FORS2 (GRISM 600R)  &525--745&400&Dec. 18 2000\\
UVES Dichroic (390+580)  & 328--445,~476--684 &13~500&Oct. 10, 11 and Nov.~17, 2001\\ 
UVES Dichroic (437+860)  &376--500,~667--1040&10~800&Nov. 17 2001\\
            \noalign{\smallskip}
            \hline
         \end{tabular}
      $$
\end{table}