\begin{table}%T1
  %%%\centering
\par
  \caption{\label{VLT_photom}A brief summary of the VLT~data.
    The first column summarizes the seeing of the final stacked images,
    the total exposure time is given in the second column. Also given
    the Magnitude Zero Points (Z.P.). The $B$ and $R$~images were obtained
    by the FORS team (provided by S. Seitz).}
  \begin{tabular}{cccc}
  \hline\hline\noalign{\smallskip}
    Filter&Seeing ($\arcsec$)& Exp. time (s)& Z.P (mag) \\ \noalign{\smallskip}\hline\noalign{\smallskip}
    $U$ & 0.72 & 5280 & 30.856 \\
    $B$ & 1.2  & 2400 & 32.888 \\
    $V$ & 0.64 & 6900 & 33.978 \\
    $R$ & 0.58 &  300 & 32.501 \\
    $I$ & 0.69 & 12~000 & 33.484 \\
    $J$ & 0.49 & 5880 & 27.643 \\
    $K$ & 0.50 & 6480 & 26.797\\\hline
  \end{tabular}
\end{table}