\begin{table}%T9
%%\centering
\par
\caption{Comparison of the dielectronic resonance strengths measured by
Beiersdorfer et~al. (\cite{bei92}) with the theoretical values. The quantities listed are
the ratios of the theoretical values to the measurements as defined in Beiersdorfer et~al. (\cite{bei92}).
Approximation key is given in Table~\ref{table1}, and the
transition labels are from Gabriel (\cite{gab72}).}
\label{table9}
\begin{tabular}{llllll}
\hline\hline
Label & AST3 & HFR4 & COR & SAF & MCDF\\ \hline
e     & 1.24 & 1.05 & 1.14 & 1.24 & 1.06 \\
j(+l) & 1.02 & 1.00 & 1.07 & 1.15 & 1.03 \\
k(+a) & 0.87 & 0.84 & 0.93 & 0.98 & 0.86 \\
m     & 1.18 & 2.10 & 1.15 & 1.29 & 1.10 \\
r     & 0.80 & 0.63 & 0.72 & 0.62 & 0.89 \\
t(+s) & 1.22 & 1.25 & 1.32 & 1.24 & 1.17 \\
o     & 1.29 &      & 1.28 & 1.25 & 1.16 \\
p     & 1.21 &      & 1.24 & 1.15 & 1.10 \\
\hline
\end{tabular}
\end{table}