\begin{table}%T2
 %%\centering
\par
 \caption{This table contains the results from verification simulation,
which used the input parameters $(3,3,0.5)$. The first column lists the\protect
detectors. The second column lists the probabilities of detection from
Table~\ref{tab1} for the same input parameters. The third column lists\protect the probability
of detection based on $10^{6}$ iterations with a FAP of 1\%, while the
accompanying errors are the standard deviation calculates from the 100
subsets of $10^{4}$ iterations in the total sample. The last
two columns show the probabilities of detection with false alarm
probabilities of~$10^{-3}$ and $10^{-4}$ respectively.\label{tab2}}
\par
 \begin{tabular}{ccccc}
  \hline\hline
\multicolumn{1}{c}{} & \multicolumn{1}{c}{Probabilities} & \multicolumn{3}{c}{False Alarm Probability}\\
Detector & from Table~\ref{tab1} & $10^{-2} \pm {\rm err}$ & $10^{-3}$ & $10^{-4}$ \\
  \hline
BLS            & 0.1393 & $0.1478 \pm 0.0069$ & 0.0519 & 0.0155 \\ 
Bayesian       & 0.0500 & $0.0505 \pm 0.0034$ & 0.0091 & 0.0016 \\
Correlation    & 0.3920 & $0.3842 \pm 0.0128$ & 0.1786 & 0.0670 \\
Matched filter & 0.4590 & $0.4517 \pm 0.0123$ & 0.2313 & 0.0943 \\
Deeg's        & 0.3617 & $0.3804 \pm 0.0114$ & 0.1783 & 0.0713 \\
 \hline
 \end{tabular}
\end{table}