\begin{table}%[!htp]%t3
\caption{\label{tab3}Estimated system parameters from maximum-entropy minimized $\chi^{2}$ fits to data from each site. $\gamma$~denote the systemic velocity, $K_{\rm 1}$ is the velocity amplitude for the primary component, $EW_{\rm pri}$ and~$EW_{\rm sec}$ are the equivalent width of the primary and secondary components respectively, $M_2/M_1$ is the mass ratio, $i$ is the inclination angle and $e$ is the eccentricity.}
%\centering
\par
\begin{tabular}{lcccccccccc}
\hline
\hline\noalign{\smallskip}
Site & $\gamma$ &$K_{\rm 1}$ &$EW_{\rm pri}$ & $EW_{\rm sec}$ & Period &$ R_{\rm pri}$& $R_{\rm sec}$&  $M_2/M_1$     & $i$ &$e$\\
     & (km~s$^{-1}$)&(km~s$^{-1}$) & (\AA) & (\AA) & (d) & ($R_{\odot}$)& ($R_{\odot}$)                   &  &(deg)&\\
\noalign{\smallskip}\hline\noalign{\smallskip} 
KPNO& $-12.74$& 49.66&117& 139&2.8377&3.3&1.1 & 0.789 &40&0\\
MSO & $-15.69$& 49.66&82 &210 &2.8377&3.3&1.1&  0.789 &40&0\\
\noalign{\smallskip} \hline
\end{tabular}
\end{table}