\begin{table}%t2
\caption{\label{tab2}Gaussian components of the \sgrastar\  Circumnuclear Disk \mbox{557-GHz}~\htmo\  line profile.}
%\centering
\par
\begin{tabular}{ccccc}
\hline\hline\noalign{\smallskip}
          & Velocity        &  $T^{*}_{\rm A}$  & Halfwidth & Source        \\
          & ($\!$\kms)          & (K)         & ($\!$\kms)    &               \\
\noalign{\smallskip}\hline\noalign{\smallskip}
I         &  $+73.2$        &  $+0.32$    & 88.5      & CND           \\
II        &  $-31.6$        &  $+0.24$    & 47.9      & CND           \\
III       &  $-4.8$         &  $-0.24$    & 13.4      & Local Sgr~Arm     \\
IV        &  $-30.2$        &  $-0.25$    & 11.0      & $-30$\ \kms\ Arm\\
V         &  $-53.5$        &  $-0.21$    & 8.1       & 3-kpc Arm     \\
VI        &  $-132.2$       &  $-0.09$    & 60.0      & EMR           \\
\noalign{\smallskip}\hline\end{tabular}
\end{table}