\begin{table}%t6
\caption{Energy binnings and differential fluxes.
The first errors are statistical and the second ones are systematic.}
  \label{tab:diff}
\setlength{\tabcolsep}{6pt}
\renewcommand{\arraystretch}{1.1}
%%\centering
\par
     \begin{tabular}{llll}
        \hline
        \hline
 Log ADC region & $<$Energy$>$ & Flux \\
  & (TeV) & (/cm$^{2}$/s/TeV) \\
        \hline
3.6--3.8 & 
	0.52 &  (3.51$~\pm~$0.72$~\pm~$1.04)$~\times ~10^{-11}$ \\
3.8--4.0 &
	0.68 &  (1.09$~\pm~$0.34$~\pm~$0.26)$~\times ~10^{-11}$ \\
4.0--4.2 &
	0.92 &  (6.40$~\pm~$1.69$~\pm~$2.23)$~\times ~10^{-12}$ \\
4.2--4.4 &
	1.23 &  (2.05$~\pm~$0.78$~\pm~$0.49)$~\times~ 10^{-12}$ \\
4.4--4.6 &
	1.73 &  (2.65$~\pm~$2.83$~\pm~$0.87)$~\times~ 10^{-13}$ \\
 4.6--4.8 &
	2.56 &  (2.31$~\pm~$8.07$~\pm~$1.57)$~\times~ 10^{-14}$ \\
        \hline
     \end{tabular}
\end{table}