\begin{table}%t3
\caption{\label{tabresults}Results and confidence limits
for $g'$-band source size, ratio between $r'$- and $g'$-band source size and
transverse velocity (projected to the lens plane).}
\small%\begin{center}
{
\begin{tabular}{ c c c c c c c c c}
\hline
\hline
 \multicolumn{4}{c}{No prior} & & \multicolumn{4}{c}{With G-M05 prior} \\
  \multicolumn{2}{c}{Source Size $\sigma_{g'}$}  & Ratio  &  Velocity (*)&
&\multicolumn{2}{c}{Source Size $\sigma_{g'}$}   &Ratio &  Velocity\\ 
$\times10^{-2}$  $R_{\rm E}$& $ \sqrt{\frac{M}{0.1~M_\odot}}$ &
$\frac{\sigma_{r'}}{\sigma_{g'}}$ & $ \sqrt{\frac{M}{0.1~M_\odot}}$&
&$\times10^{-2}$  $R_{\rm E}$ & $\sqrt{\frac{M}{0.1~M_\odot}}$&
$\frac{\sigma_{r'}}{\sigma_{g'}}$ & $ \sqrt{\frac{M}{0.1~M_\odot}}$  \\ 
    & $\times10^{15}$[cm] & & [km~s$^{-1}$]& & & $\times10^{15}$~[cm] & & [km~s$^{-1}$]  \\
\hline \noalign{\smallskip}
$\rm 8.11^{+5.90}_{-5.99}$ &$\rm 4.60^{+3.36}_{-3.40}$ &$\rm 1.25^{+0.45}_{-0.15}$ &$2930$& &
$\rm 2.34^{+0.43}_{-1.28}$ &$\rm 1.33^{+0.24}_{-0.73}$ & $\rm 1.45^{+0.90}_{-0.25}$
&$\rm 682^{+227}_{-379}$ \\ 
\hline 
\end{tabular}}
\parbox{14cm}{
* The velocity obtained without the G-M05 prior is shown without
error bars as we do not obtain limits for it.}
%\end{center}
\end{table}